)c (GeV/ Tp 0.5 1 1.5 2 2.5 3 3.5 4

{2PC, sub} 2v

0

0.05

0.1

0.15

0.2

0.25 ALICE = 5.02 TeV NN s p-Pb (0-20%) - (60-100%) h π K p